From da5ff37c7ede7aa4e6883f4dd5a83b6cf8b9837f Mon Sep 17 00:00:00 2001
From: Randy Dunlap <rdunlap@infradead.org>
Date: Sat, 27 Jan 2018 16:31:45 -0800
Subject: Documentation/cdrom: fix German sharp s in LaTex
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Apparently the LaTex abbreviation for the German "sharp s" (ß)
(Unicode U+00DF) has changed from {\sz} to {\ss}.  With {\sz},
I get this error at line 1016 (line number after another patch):

! Undefined control sequence.
l.1016 ...nel~2.0.  Further thanks to Heiko Ei{\sz
                                                  }feldt,

This is fixed by changing the {\sz} to {\ss}.

Signed-off-by: Randy Dunlap <rdunlap@infradead.org>
Signed-off-by: Jens Axboe <axboe@kernel.dk>
---
 Documentation/cdrom/cdrom-standard.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'Documentation/cdrom/cdrom-standard.tex')

diff --git a/Documentation/cdrom/cdrom-standard.tex b/Documentation/cdrom/cdrom-standard.tex
index 9083c21472d6..f7cd455973f7 100644
--- a/Documentation/cdrom/cdrom-standard.tex
+++ b/Documentation/cdrom/cdrom-standard.tex
@@ -1013,7 +1013,7 @@ taken over the torch in maintaining \cdromc\ and integrating much
 \cdrom-related code in the 2.1-kernel.  Thanks to Scott Snyder and
 Gerd Knorr, who were the first to implement this interface for SCSI
 and IDE-CD drivers and added many ideas for extension of the data
-structures relative to kernel~2.0.  Further thanks to Heiko Ei{\sz}feldt,
+structures relative to kernel~2.0.  Further thanks to Heiko Ei{\ss}feldt,
 Thomas Quinot, Jon Tombs, Ken Pizzini, Eberhard M\"onkeberg and Andrew
 Kroll, the \linux\ \cdrom\ device driver developers who were kind
 enough to give suggestions and criticisms during the writing. Finally
-- 
cgit v1.2.3

