From 931c2cad0da1a84e3df0745b385ec06d29cc2634 Mon Sep 17 00:00:00 2001
From: Maksim Zakharov <m.zakharov@IBS.RU>
Date: Mon, 20 Jun 2022 11:52:15 +0300
Subject: fix Modals, Tables and Pages: event logs, inventoty, post logs,
 operttions, global styles

---
 .../ServerPowerOperations.vue                      | 37 +++++++++++-----------
 1 file changed, 19 insertions(+), 18 deletions(-)

(limited to 'src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue')

diff --git a/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue b/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
index a394a77f9..823caa950 100644
--- a/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
+++ b/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
@@ -1,15 +1,15 @@
 <template>
   <b-container fluid="xxl pt-0 m-0">
     <page-title />
-    <b-row class="m-2">
+    <page-section
+      :section-title="$t('pageServerPowerOperations.serverStatus')"
+      class="m-4"
+    >
       <b-col md="8" xl="6">
-        <page-section class="m-2 pt-2 pb-2">
+        <page-section class="pt-2 mb-0">
           <b-row>
             <b-col>
               <dl>
-                <dt class="semi-bold-16px">
-                  {{ $t('pageServerPowerOperations.serverStatus') }}
-                </dt>
                 <dd
                   v-if="serverStatus === 'on'"
                   style="margin-top: 10px"
@@ -60,13 +60,13 @@
           </b-row>
         </page-section>
       </b-col>
-    </b-row>
-    <b-row class="m-2">
+    </page-section>
+    <page-section
+      :section-title="$t('SystemDescription.title.Control')"
+      class="ml-4 mb-0"
+    >
       <b-col sm="8" md="6" xl="7">
-        <page-section class="m-2">
-          <b-row class="ml-0 mb-3">
-            <span class="semi-bold-16px">{{ 'Управление' }}</span>
-          </b-row>
+        <page-section>
           <alert :show="oneTimeBootEnabled" variant="warning">
             {{ $t('pageServerPowerOperations.oneTimeBootWarning') }}
           </alert>
@@ -177,14 +177,15 @@
           </template>
         </page-section>
       </b-col>
-    </b-row>
-    <b-row>
-      <b-col v-if="hasBootSourceOptions" class="m-2" sm="8" md="6" xl="4">
-        <page-section class="m-2">
-          <boot-settings />
-        </page-section>
+    </page-section>
+    <page-section
+      :section-title="$t('pageServerPowerOperations.serverBootSettings')"
+      class="m-4"
+    >
+      <b-col v-if="hasBootSourceOptions" sm="8" md="6" xl="4">
+        <boot-settings />
       </b-col>
-    </b-row>
+    </page-section>
   </b-container>
 </template>
 
-- 
cgit v1.2.3

