From 3111b6fa81cea34c6933491ace636f4fdd1dade3 Mon Sep 17 00:00:00 2001
From: Yoshie Muranaka <yoshiemuranaka@gmail.com>
Date: Tue, 21 Apr 2020 19:48:38 -0700
Subject: Update layout fluid prop to set max-width

Setting page container fluid prop to 'xl' to allow fluid/100%
container width until reaching the xl breakpoint. After
reaching the xl breakpoint, a max-width is set to the
container.
This will make sure that the page content doesn't stretch
into an unreasonable layout on wide viewports.
https://bootstrap-vue.org/docs/components/layout#fluid-width-container

Signed-off-by: Yoshie Muranaka <yoshiemuranaka@gmail.com>
Change-Id: Ic50dd3b4339d532663279350afdcc30e59bb0c74
---
 src/views/AccessControl/LocalUserManagement/LocalUserManagement.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/views/AccessControl/LocalUserManagement/LocalUserManagement.vue')

diff --git a/src/views/AccessControl/LocalUserManagement/LocalUserManagement.vue b/src/views/AccessControl/LocalUserManagement/LocalUserManagement.vue
index 8c7cc7fcf..962e5bfa2 100644
--- a/src/views/AccessControl/LocalUserManagement/LocalUserManagement.vue
+++ b/src/views/AccessControl/LocalUserManagement/LocalUserManagement.vue
@@ -1,5 +1,5 @@
 <template>
-  <b-container fluid>
+  <b-container fluid="xl">
     <page-title />
     <b-row>
       <b-col xl="9" class="text-right">
-- 
cgit v1.2.3

