From 1b8d6d756c9dff14d3dd8298ecae7d6fe73192e5 Mon Sep 17 00:00:00 2001
From: Maksim Zakharov <m.zakharov@IBS.RU>
Date: Mon, 6 Jun 2022 18:39:19 +0300
Subject: Delete main-container, add global scroll to pages, add global style
 for logs.

---
 src/components/AppHeader/AppHeader.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/AppHeader/AppHeader.vue')

diff --git a/src/components/AppHeader/AppHeader.vue b/src/components/AppHeader/AppHeader.vue
index 939ec5af3..81287163b 100644
--- a/src/components/AppHeader/AppHeader.vue
+++ b/src/components/AppHeader/AppHeader.vue
@@ -112,7 +112,7 @@
           <status-icon :status="serverStatusIcon" />
           {{ $t('appHeader.power') }}
         </b-nav-item>
-        <div class="nav-item header-clock__icon">
+        <div class="nav-item">
           <b-button
             id="app-header-refresh"
             variant="link"
-- 
cgit v1.2.3

